<template>
  <div id="screen" >
    <div class="hide_menu"></div>
    <iframe frameborder="no"  width="100%" height="100%" :src="nlpSrc"></iframe>
  </div>
</template>

<script>
  import {getNLPAuthData} from "@/utils/auth";
  export default {
    name: "Index",
    data() {
      return {
        nlpAuthData: getNLPAuthData(),
        nlpSrc: 'http://10.70.192.135:8000/#/'
      }
    },
    created() {
      //带上authData 跳转到 nlp 系统
      if(this.nlpAuthData && this.nlpAuthData.length > 0) {
        this.nlpSrc = this.nlpSrc + "?authData=" + encodeURI(this.nlpAuthData)
      } else {
        // 提示nlp登录失败，请修改nlp系统密码与本系统一致
        this.$modal.msgError("智能数据搜索系统登录失败，请修改密码与本系统一致");
      }
    },
  }
</script>

<style>
  #screen{
    padding:0px;
    margin:0px;
    position:absolute;
    top:0px;
    left:0px;
    width:100%;
    height:100%;
    border:hidden;
  }

  .hide_menu {
    width:300px;
    height: 3.375rem !important;
    position: absolute;
    top:0;
    right: 12px;
    background: #f5f6f7;
  }
</style>
